From fbb3b7f05737f9571b04b0a8f4f15c0928de8545 Mon Sep 17 00:00:00 2001
From: dujinkim <dujin.kim@dtsolution.co.kr>
Date: Mon, 7 Jul 2025 01:43:36 +0000
Subject: (대표님) 변경사항 20250707 10시 43분
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

---
 app/[lng]/engineering/(engineering)/dashboard/page.tsx | 17 -----------------
 1 file changed, 17 deletions(-)
 delete mode 100644 app/[lng]/engineering/(engineering)/dashboard/page.tsx

(limited to 'app/[lng]/engineering/(engineering)/dashboard/page.tsx')

diff --git a/app/[lng]/engineering/(engineering)/dashboard/page.tsx b/app/[lng]/engineering/(engineering)/dashboard/page.tsx
deleted file mode 100644
index 1d61dc16..00000000
--- a/app/[lng]/engineering/(engineering)/dashboard/page.tsx
+++ /dev/null
@@ -1,17 +0,0 @@
-// app/invalid-access/page.tsx
-
-export default function InvalidAccessPage() {
-    return (
-      <main style={{ padding: '40px', textAlign: 'center' }}>
-        <h1>부적절한 접근입니다</h1>
-        <p>
-          협력업체(Vendor)가 EVCP 화면에 접속하거나 <br />
-          SHI 계정이 협력업체 화면에 접속하려고 시도하는 경우입니다.
-        </p>
-        <p>
-          <strong>접근 권한이 없으므로, 다른 화면으로 이동해 주세요.</strong>
-        </p>
-      </main>
-    );
-  }
-  
\ No newline at end of file
-- 
cgit v1.2.3

